From fc1f28995deec01b48581e2eb1070c1c5a4ad6ab Mon Sep 17 00:00:00 2001
From: =?utf8?q?W=C5=82odzimierz=20Skiba?= <abx@abx.art.pl>
Date: Thu, 28 Oct 2004 14:24:43 +0000
Subject: [PATCH] Missed CanRead and correct type for Eof (bug #983978).

git-svn-id: https://svn.wxwidgets.org/svn/wx/wxWidgets/trunk@30148 c3d73ce0-8a6f-49c7-b76d-6d57e0e08775
---
 docs/latex/wx/inputstr.tex | 9 ++++++++-
 1 file changed, 8 insertions(+), 1 deletion(-)

diff --git a/docs/latex/wx/inputstr.tex b/docs/latex/wx/inputstr.tex
index 54897253f8..7f48f40df4 100644
--- a/docs/latex/wx/inputstr.tex
+++ b/docs/latex/wx/inputstr.tex
@@ -30,6 +30,13 @@ Creates a dummy input stream.
 
 Destructor.
 
+\membersection{wxInputStream::CanRead}\label{wxinputstreamcanread}
+
+\constfunc{bool}{CanRead}{\void}
+
+Returns true if some data is available in the stream right now, so that
+calling \helpref{Read()}{wxinputstreamread} wouldn't block.
+
 \membersection{wxInputStream::GetC}\label{wxinputstreamgetc}
 
 \func{char}{GetC}{\void}
@@ -43,7 +50,7 @@ If EOF, return value is undefined and LastRead() will return 0 and not 1.
 
 \membersection{wxInputStream::Eof}\label{wxinputstreameof}
 
-\constfunc{wxInputStream}{Eof}{\void}
+\constfunc{bool}{Eof}{\void}
 
 Returns true if the end of stream has been reached.
 
-- 
2.50.0

