From eaf498dffe669663ea40394798d6a35ffc7fb62e Mon Sep 17 00:00:00 2001
From: =?utf8?q?V=C3=A1clav=20Slav=C3=ADk?= <vslavik@fastmail.fm>
Date: Sun, 26 Jan 2003 23:20:42 +0000
Subject: [PATCH] fixed someone's typo

git-svn-id: https://svn.wxwidgets.org/svn/wx/wxWidgets/trunk@18954 c3d73ce0-8a6f-49c7-b76d-6d57e0e08775
---
 docs/latex/wx/flexsizr.tex | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

diff --git a/docs/latex/wx/flexsizr.tex b/docs/latex/wx/flexsizr.tex
index 0ce1e99fe4..c27734f92c 100644
--- a/docs/latex/wx/flexsizr.tex
+++ b/docs/latex/wx/flexsizr.tex
@@ -123,7 +123,7 @@ Specifies that row idx is no longer growable.
 \func{void}{SetFlexibleDirections}{\param{int }{direction}}
 
 Specifies whether the sizer should flexibly resize its columns, rows, or
-both. Argument {\t direction} can be {\tt wxVERTICAL}, {\tt wxHORIZONTAL} 
+both. Argument {\tt direction} can be {\tt wxVERTICAL}, {\tt wxHORIZONTAL} 
 or {\tt wxBOTH} (which is the default value). Any other value is ignored. See
 \helpref{GetFlexibleDirection()}{wxflexgridsizergetflexibledrection} for the
 explanation of these values.
-- 
2.50.0

