From da97b2609e01d9cc2ea50a697c959d7431ddd427 Mon Sep 17 00:00:00 2001
From: Kevin Ollivier <kevino@theolliviers.com>
Date: Mon, 4 Dec 2006 18:54:12 +0000
Subject: [PATCH] Mention the wxSystemOption for turning on the generic
 wxListCtrl on OS X in the docs.

git-svn-id: https://svn.wxwidgets.org/svn/wx/wxWidgets/trunk@43809 c3d73ce0-8a6f-49c7-b76d-6d57e0e08775
---
 docs/latex/wx/listctrl.tex | 5 +++++
 docs/latex/wx/sysopt.tex   | 3 +++
 2 files changed, 8 insertions(+)

diff --git a/docs/latex/wx/listctrl.tex b/docs/latex/wx/listctrl.tex
index 538cc1942a..20920d0c85 100644
--- a/docs/latex/wx/listctrl.tex
+++ b/docs/latex/wx/listctrl.tex
@@ -38,6 +38,11 @@ Using many of wxListCtrl features is shown in the
 To intercept events from a list control, use the event table macros described
 in \helpref{wxListEvent}{wxlistevent}.
 
+{\bf Mac Note:} Starting with 2.8, wxListCtrl uses a native implementation for 
+report mode, and uses a generic implementation for other modes. You can use the
+generic implementation for report mode as well by setting the 
+mac.listctrl.always_use_generic \helpref{wxSystemOption}{wxsystemoptions} to 1.
+
 \wxheading{Derived from}
 
 \helpref{wxControl}{wxcontrol}\\
diff --git a/docs/latex/wx/sysopt.tex b/docs/latex/wx/sysopt.tex
index 99a4d5129a..0c601ff5df 100644
--- a/docs/latex/wx/sysopt.tex
+++ b/docs/latex/wx/sysopt.tex
@@ -42,6 +42,9 @@ used.}
 a window. You can also use the symbol wxMAC\_WINDOW\_PLAIN\_TRANSITION.}
 \twocolitem{window-default-variant}{The default variant used by windows (cast to integer from the wxWindowVariant enum).
 Also known as wxWINDOW\_DEFAULT\_VARIANT.}
+\twocolitem{mac.listctrl.always_use_generic}{Tells wxListCtrl to use the generic 
+control even when it is capable of using the native control instead. 
+Also knwon as wxMAC\_ALWAYS\_USE\_GENERIC\_LISTCTRL.}
 \end{twocollist}
 
 \wxheading{MGL}
-- 
2.45.2

