From d1f1e77a91f3d7e60470e50dc941fce6b813d11d Mon Sep 17 00:00:00 2001
From: Mattia Barbon <mbarbon@cpan.org>
Date: Thu, 2 May 2002 20:09:25 +0000
Subject: [PATCH] Missing bracket in array.tex Documentation for
 wxStatusBar::Push/PopStatusText Documentation for wxFrame::Push/PopStatusText
 and Get/SetStatusBarPane.

git-svn-id: https://svn.wxwidgets.org/svn/wx/wxWidgets/trunk@15340 c3d73ce0-8a6f-49c7-b76d-6d57e0e08775
---
 docs/latex/wx/array.tex    |  2 +-
 docs/latex/wx/frame.tex    | 36 ++++++++++++++++++++++++++++++++++++
 docs/latex/wx/statusbr.tex | 18 ++++++++++++++++++
 3 files changed, 55 insertions(+), 1 deletion(-)

diff --git a/docs/latex/wx/array.tex b/docs/latex/wx/array.tex
index 1918006e74..1bb7d0f338 100644
--- a/docs/latex/wx/array.tex
+++ b/docs/latex/wx/array.tex
@@ -573,7 +573,7 @@ elements of a wxArray (supposed to contain pointers).
 
 \membersection{wxArray::RemoveAt}\label{wxarrayremoveat}
 
-\func{\void}{RemoveAt}{\param{size\_t }{index}, \param{size\_t }{count = $1$}
+\func{\void}{RemoveAt}{\param{size\_t }{index}, \param{size\_t }{count = $1$}}
 
 Removes {\it count} elements starting at {\it index} from the array. When an
 element is removed from wxObjArray it is deleted by the array - use
diff --git a/docs/latex/wx/frame.tex b/docs/latex/wx/frame.tex
index 950fe6da08..0dc9cffa0f 100644
--- a/docs/latex/wx/frame.tex
+++ b/docs/latex/wx/frame.tex
@@ -608,3 +608,39 @@ This function has not been tested with MDI frames.
 
 \helpref{wxFrame::IsFullScreen}{wxframeisfullscreen}
 
+\membersection{wxFrame::SetStatusBarPane}\label{wxframesetstatusbarpane}
+
+\func{void}{SetStatusBarPane}{\param{int}{ n}}
+
+Set the status bar pane used to display menu and toolbar help.
+Using -1 disables help display.
+
+\membersection{wxFrame::GetStatusBarPane}\label{wxframegetstatusbarpane}
+
+\func{int}{GetStatusBarPane}{\void}
+
+Returns the status bar pane used to display menu and toolbar help.
+
+\wxheading{See also}
+
+\helpref{wxFrame::SetStatusBarPane}{wxframesetstatusbarpane}
+
+\membersection{wxFrame::SetStatusBarPane}\label{wxframesetstatusbarpane}
+
+\func{void}{SetStatusBarPane}{\param{int}{ n}}
+
+Set the status bar pane used to display menu and toolbar help.
+Using -1 disables help display.
+
+\membersection{wxFrame::GetStatusBarPane}\label{wxframegetstatusbarpane}
+
+\func{int}{GetStatusBarPane}{\void}
+
+Returns the status bar pane used to display menu and toolbar help.
+
+\wxheading{See also}
+
+\helpref{wxFrame::SetStatusBarPane}{wxframesetstatusbarpane}
+
+
+
diff --git a/docs/latex/wx/statusbr.tex b/docs/latex/wx/statusbr.tex
index 72ca80f542..777b676478 100644
--- a/docs/latex/wx/statusbr.tex
+++ b/docs/latex/wx/statusbr.tex
@@ -138,6 +138,24 @@ The status field string if the field is valid, otherwise the empty string.
 
 \helpref{wxStatusBar::SetStatusText}{wxstatusbarsetstatustext}
 
+\membersection{wxStatusBar::PopStatusText}\label{wxstatusbarpushstatustext}
+
+\func{void}{PopStatusText}{\param{int}{ field = 0}}
+
+Sets the field text to the top of the stack, and pops the stack of saved
+strings.
+
+\wxheading{See also}
+
+\helpref{wxStatusBar::PushStatusText}{wxstatusbarpushstatustext}
+
+\membersection{wxStatusBar::PushStatusText}\label{wxstatusbarpushstatustext}
+
+\func{void}{PushStatusText}{\param{const wxString&}{ string}, \param{int}{ field = 0}}
+
+Saves the current field text in a per field stack, and sets the field text
+to the string passed as argument.
+
 %% VZ: these functions are not in wxStatusBar API, these are just
 %%     implementation details of wxStatusBarGeneric
 %%
-- 
2.50.0

