From d0247e6729feedef2ca4833a95aa44e9002da9ec Mon Sep 17 00:00:00 2001
From: Vadim Zeitlin <vadim@wxwidgets.org>
Date: Fri, 6 Aug 2004 18:28:19 +0000
Subject: [PATCH] removed not existing GiveFeedback() parameter

git-svn-id: https://svn.wxwidgets.org/svn/wx/wxWidgets/trunk@28666 c3d73ce0-8a6f-49c7-b76d-6d57e0e08775
---
 docs/latex/wx/dropsrc.tex | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

diff --git a/docs/latex/wx/dropsrc.tex b/docs/latex/wx/dropsrc.tex
index 5d4e98e88a..dd1ccce9ef 100644
--- a/docs/latex/wx/dropsrc.tex
+++ b/docs/latex/wx/dropsrc.tex
@@ -96,7 +96,7 @@ wxDragMove}, {\tt wxDragCancel} or {\tt wxDragNone} if an error occured.
 
 \membersection{wxDropSource::GiveFeedback}\label{wxdropsourcegivefeedback}
 
-\func{virtual bool}{GiveFeedback}{\param{wxDragResult }{effect}, \param{bool }{scrolling}}
+\func{virtual bool}{GiveFeedback}{\param{wxDragResult }{effect}}
 
 Overridable: you may give some custom UI feedback during the drag and drop operation
 in this function. It is called on each mouse move, so your implementation must not be too
-- 
2.50.0

