From ba9f095e75ab9cc919429743d2d43fbc0379d19e Mon Sep 17 00:00:00 2001
From: =?utf8?q?V=C3=A1clav=20Slav=C3=ADk?= <vslavik@fastmail.fm>
Date: Sat, 11 Mar 2000 10:05:09 +0000
Subject: [PATCH] fixed documentation of wxList::Clear behavior after
 DeleteContents(TRUE)

git-svn-id: https://svn.wxwidgets.org/svn/wx/wxWidgets/trunk@6614 c3d73ce0-8a6f-49c7-b76d-6d57e0e08775
---
 docs/latex/wx/list.tex | 3 ++-
 1 file changed, 2 insertions(+), 1 deletion(-)

diff --git a/docs/latex/wx/list.tex b/docs/latex/wx/list.tex
index 5e49493589..663ac42594 100644
--- a/docs/latex/wx/list.tex
+++ b/docs/latex/wx/list.tex
@@ -175,7 +175,8 @@ The key string is copied and stored by the list implementation.
 
 \func{void}{Clear}{\void}
 
-Clears the list (but does not delete the client data stored with each node).
+Clears the list (but does not delete the client data stored with each node
+unless you called DeleteContents(TRUE), in which case it deletes data).
 
 \membersection{wxList::DeleteContents}\label{wxlistdeletecontents}
 
-- 
2.50.0

