From a818cceade4aa67ef4fd7022a917978055352000 Mon Sep 17 00:00:00 2001
From: =?utf8?q?Karsten=20Ball=C3=BCder?= <ballueder@usa.net>
Date: Mon, 22 Mar 1999 14:51:27 +0000
Subject: [PATCH] fixed the description of wxSafeYield()

git-svn-id: https://svn.wxwidgets.org/svn/wx/wxWidgets/trunk@1954 c3d73ce0-8a6f-49c7-b76d-6d57e0e08775
---
 docs/latex/wx/function.tex | 4 +++-
 1 file changed, 3 insertions(+), 1 deletion(-)

diff --git a/docs/latex/wx/function.tex b/docs/latex/wx/function.tex
index a3bc04a831..00cabcc85b 100644
--- a/docs/latex/wx/function.tex
+++ b/docs/latex/wx/function.tex
@@ -1326,7 +1326,9 @@ Now obsolete: use \helpref{wxWindow::Close}{wxwindowclose} instead.
 \func{bool}{wxSafeYield}{\param{wxWindow*}{ win = NULL}}
 
 This function is similar to wxYield, except that it disables the user input to
-the given window {\it win} or to all program windows if {\it win} is NULL.
+all program windows before calling wxYield and re-enables it again
+afterwards. If {\it win} is not NULL, this window will remain enabled, 
+allowing the implementation of some limited user interaction.
 
 Returns the result of the call to \helpref{::wxYield}{wxyield}.
 
-- 
2.50.0

