From a3dae7b72cd2d1852398892d514eafd65cd34b64 Mon Sep 17 00:00:00 2001
From: Robert Roebling <robert@roebling.de>
Date: Mon, 30 Oct 2006 15:02:34 +0000
Subject: [PATCH]   Mark GetMinSize() as virtual and explain why.

git-svn-id: https://svn.wxwidgets.org/svn/wx/wxWidgets/trunk@42724 c3d73ce0-8a6f-49c7-b76d-6d57e0e08775
---
 docs/latex/wx/window.tex | 8 +++++---
 1 file changed, 5 insertions(+), 3 deletions(-)

diff --git a/docs/latex/wx/window.tex b/docs/latex/wx/window.tex
index fc2585ede5..438768873c 100644
--- a/docs/latex/wx/window.tex
+++ b/docs/latex/wx/window.tex
@@ -1091,14 +1091,16 @@ by name.
 \constfunc{wxSize}{GetMaxSize}{\void}
 
 Returns the maximum size of the window, an indication to the sizer layout mechanism
-that this is the maximum possible size.
+that this is the maximum possible size. 
 
 \membersection{wxWindow::GetMinSize}\label{wxwindowgetminsize}
 
-\constfunc{wxSize}{GetMinSize}{\void}
+\constfunc{virtual wxSize}{GetMinSize}{\void}
 
 Returns the minimum size of the window, an indication to the sizer layout mechanism
-that this is the minimum required size.
+that this is the minimum required size. It normally just returns the value set
+by \helpref{SetMinSize}{wxwindowsetminsize}, but it can be overridden to do the
+calculation on demand.
 
 \membersection{wxWindow::GetName}\label{wxwindowgetname}
 
-- 
2.50.0

