From 9856788f589fd2b7c8eb262e130cc7a6abe3d67c Mon Sep 17 00:00:00 2001
From: Vadim Zeitlin <vadim@wxwidgets.org>
Date: Tue, 11 Jan 2000 14:10:24 +0000
Subject: [PATCH] EnableTool() should be called after Realize()

git-svn-id: https://svn.wxwidgets.org/svn/wx/wxWidgets/trunk@5340 c3d73ce0-8a6f-49c7-b76d-6d57e0e08775
---
 docs/latex/wx/toolbar.tex | 3 +++
 1 file changed, 3 insertions(+)

diff --git a/docs/latex/wx/toolbar.tex b/docs/latex/wx/toolbar.tex
index 84f98efaf1..20d988a8f8 100644
--- a/docs/latex/wx/toolbar.tex
+++ b/docs/latex/wx/toolbar.tex
@@ -251,6 +251,9 @@ Enables or disables the tool.
 
 \docparam{enable}{If TRUE, enables the tool, otherwise disables it.}
 
+{\bf NB:} This function should only be called after 
+\helpref{Realize}{wxtoolbarrealize}.
+
 \wxheading{Remarks}
 
 For wxToolBarSimple, does nothing. Some other implementations
-- 
2.50.0

