From 7f54e70f1705eecc2ee274e7c8fee51c0fd2211b Mon Sep 17 00:00:00 2001
From: Mart Raudsepp <leio@gentoo.org>
Date: Thu, 14 Jul 2005 16:12:02 +0000
Subject: [PATCH] wxGLCanvas ctors have default values for pos and size.
 Document it for the first ctor, the other ctors don't have a default arg set
 for wxGLContext* and wxGLCanvas* in some platform headers, so not sure if can
 add the pos and size that follow it to the docs.

git-svn-id: https://svn.wxwidgets.org/svn/wx/wxWidgets/trunk@34846 c3d73ce0-8a6f-49c7-b76d-6d57e0e08775
---
 docs/latex/wx/glcanvas.tex | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

diff --git a/docs/latex/wx/glcanvas.tex b/docs/latex/wx/glcanvas.tex
index f0cbc168c6..ff8d0cc2e1 100644
--- a/docs/latex/wx/glcanvas.tex
+++ b/docs/latex/wx/glcanvas.tex
@@ -66,8 +66,8 @@ alpha channel, and accum buffer. Other implementations may support them.
 
 \membersection{wxGLCanvas::wxGLCanvas}\label{wxglcanvasconstr}
 
-\func{void}{wxGLCanvas}{\param{wxWindow* }{parent}, \param{wxWindowID}{ id = -1}, \param{const wxPoint\&}{ pos},
- \param{const wxSize\&}{ size}, \param{long}{ style=0}, \param{const wxString\& }{name="GLCanvas"},
+\func{void}{wxGLCanvas}{\param{wxWindow* }{parent}, \param{wxWindowID}{ id = -1}, \param{const wxPoint\&}{ pos = wxDefaultPosition},
+ \param{const wxSize\&}{ size = wxDefaultSize}, \param{long}{ style=0}, \param{const wxString\& }{name="GLCanvas"},
  \param{int*}{ attribList = 0}, \param{const wxPalette\&}{ palette = wxNullPalette}}
 
 \func{void}{wxGLCanvas}{\param{wxWindow* }{parent}, \param{wxGLCanvas* }{ sharedCanvas = NULL}, \param{wxWindowID}{ id = -1}, \param{const wxPoint\&}{ pos},
-- 
2.47.2

