From 7f071e73f22d693f75d1a8bbefccb9686a089b28 Mon Sep 17 00:00:00 2001
From: =?utf8?q?V=C3=A1clav=20Slav=C3=ADk?= <vslavik@fastmail.fm>
Date: Fri, 14 Jan 2000 21:43:50 +0000
Subject: [PATCH] fixed typos

git-svn-id: https://svn.wxwidgets.org/svn/wx/wxWidgets/trunk@5402 c3d73ce0-8a6f-49c7-b76d-6d57e0e08775
---
 docs/latex/wx/window.tex | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

diff --git a/docs/latex/wx/window.tex b/docs/latex/wx/window.tex
index d4774806bb..f8a0cfa39b 100644
--- a/docs/latex/wx/window.tex
+++ b/docs/latex/wx/window.tex
@@ -446,14 +446,14 @@ Returns the background colour of the window.
 \helpref{wxWindow::GetForegroundColour}{wxwindowgetforegroundcolour},\rtfsp
 \helpref{wxWindow::OnEraseBackground}{wxwindowonerasebackground}
 
-\membersection{wxWindow::GetBestSize}{wxwindowgetbestsize}
+\membersection{wxWindow::GetBestSize}\label{wxwindowgetbestsize}
 
 \constfunc{virtual wxSize}{GetBestSize}{\void}
 
 This functions returns the best acceptable minimal size for the window. For
 example, for a static control, it will be the minimal size such that the
 control label is not truncated. For windows containing subwindows (typically 
-\helpref{wxPanel}wxpanel}), the size returned by this function will be the
+\helpref{wxPanel}{wxpanel}), the size returned by this function will be the
 same as the size the window would have had after calling 
 \helpref{Fit}{wxwindowfit}.
 
-- 
2.50.0

