From 7e1897c067ddb8218e05e0751cfe3e0521a5bfba Mon Sep 17 00:00:00 2001
From: Vadim Zeitlin <vadim@wxwidgets.org>
Date: Thu, 26 Oct 2006 19:11:45 +0000
Subject: [PATCH] rename UpdatePulse() to Pulse() (forgot to commit with the
 rest of the changes)

git-svn-id: https://svn.wxwidgets.org/svn/wx/wxWidgets/trunk@42463 c3d73ce0-8a6f-49c7-b76d-6d57e0e08775
---
 docs/latex/wx/progdlg.tex | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

diff --git a/docs/latex/wx/progdlg.tex b/docs/latex/wx/progdlg.tex
index 10d71cc00f..1c98623d11 100644
--- a/docs/latex/wx/progdlg.tex
+++ b/docs/latex/wx/progdlg.tex
@@ -112,9 +112,9 @@ empty (which is the default) the message is not changed.}
 \helpref{Update}{wxprogressdialogupdate} call, this is set to true.}
 
 
-\membersection{wxProgressDialog::UpdatePulse}\label{wxprogressdialogupdatepulse}
+\membersection{wxProgressDialog::Pulse}\label{wxprogressdialogpdatepulse}
 
-\func{virtual bool}{UpdatePulse}{\param{const wxString\& }{newmsg = ""},\rtfsp
+\func{virtual bool}{Pulse}{\param{const wxString\& }{newmsg = ""},\rtfsp
 \param{bool *}{skip = NULL}}
 
 Just like \helpref{Update}{wxprogressdialogupdate} but makes
-- 
2.50.0

