From 7b4c31495268b3452019c67e52ff8ff86c03e36c Mon Sep 17 00:00:00 2001
From: Vadim Zeitlin <vadim@wxwidgets.org>
Date: Sat, 25 Jan 2003 01:09:42 +0000
Subject: [PATCH] moved GetRed() in its correct place in alphabetical order

git-svn-id: https://svn.wxwidgets.org/svn/wx/wxWidgets/trunk@18912 c3d73ce0-8a6f-49c7-b76d-6d57e0e08775
---
 docs/latex/wx/image.tex | 12 ++++++------
 1 file changed, 6 insertions(+), 6 deletions(-)

diff --git a/docs/latex/wx/image.tex b/docs/latex/wx/image.tex
index 2de5f97266..b932f7a6fd 100644
--- a/docs/latex/wx/image.tex
+++ b/docs/latex/wx/image.tex
@@ -397,12 +397,6 @@ available images.
 Number of available images. For most image handlers, this is 1 (exceptions
 are TIFF and ICO formats).
 
-\membersection{wxImage::GetRed}\label{wximagegetred}
-
-\constfunc{unsigned char}{GetRed}{\param{int}{ x}, \param{int}{ y}}
-
-Returns the red intensity at the given coordinate.
-
 \membersection{wxImage::GetHandlers}
 
 \func{static wxList\&}{GetHandlers}{\void}
@@ -446,6 +440,12 @@ used when converting to wxBitmap under Windows.
 
 Eventually wxImage handlers will set the palette if one exists in the image file.
 
+\membersection{wxImage::GetRed}\label{wximagegetred}
+
+\constfunc{unsigned char}{GetRed}{\param{int}{ x}, \param{int}{ y}}
+
+Returns the red intensity at the given coordinate.
+
 \membersection{wxImage::GetSubImage}\label{wximagegetsubimage}
 
 \constfunc{wxImage}{GetSubImage}{\param{const wxRect\&}{ rect}}
-- 
2.45.2

