From 78382290bba64efb350fd9b66d48553491d78115 Mon Sep 17 00:00:00 2001
From: Julian Smart <julian@anthemion.co.uk>
Date: Sat, 2 Apr 2005 16:07:29 +0000
Subject: [PATCH] Small doc mods

git-svn-id: https://svn.wxwidgets.org/svn/wx/wxWidgets/trunk@33266 c3d73ce0-8a6f-49c7-b76d-6d57e0e08775
---
 docs/latex/wx/tempfilestrm.tex | 1 +
 docs/latex/wx/wxmsw.tex        | 5 +++++
 2 files changed, 6 insertions(+)

diff --git a/docs/latex/wx/tempfilestrm.tex b/docs/latex/wx/tempfilestrm.tex
index 01fe8964a0..e2679eb79f 100644
--- a/docs/latex/wx/tempfilestrm.tex
+++ b/docs/latex/wx/tempfilestrm.tex
@@ -53,3 +53,4 @@ to the old name.
 
 Discard changes: the old file contents are not changed, the temporary file is
 deleted.
+
diff --git a/docs/latex/wx/wxmsw.tex b/docs/latex/wx/wxmsw.tex
index 1ba189e674..2f6ec969bf 100644
--- a/docs/latex/wx/wxmsw.tex
+++ b/docs/latex/wx/wxmsw.tex
@@ -340,6 +340,11 @@ by using wxCLOSE\_BOX to indicate when the OK button should be displayed.
 \item {\bf Dynamic adaptation.} We should probably be using run-time tests more
 than preprocessor tests, so that the same WinCE application can run on different
 versions of the operating system.
+\item {\bf Modeless dialogs.} When a modeless dialog is hidden with the OK button, it doesn't restore the
+frame's menubar. See for example the find dialog in the dialogs sample. However, the menubar is restored
+if pressing Cancel (the window is closed). This reflects the fact that modeless dialogs are
+not very useful on Windows CE; however, we could perhaps destroy/restore a modeless dialog's menubar
+on deactivation and activation.
 \item {\bf Home screen plugins.} Figure out how to make home screen plugins for use with wxWidgets
 applications (see {\tt http://www.codeproject.com/ce/CTodayWindow.asp} for inspiration).
 Although we can't use wxWidgets to create the plugin (too large), we could perhaps write
-- 
2.50.0

