From 6394c5966cf356f338dbd65fb762c9214dd0f738 Mon Sep 17 00:00:00 2001
From: Julian Smart <julian@anthemion.co.uk>
Date: Mon, 27 Jan 2003 11:27:43 +0000
Subject: [PATCH] Corrected printing docs

git-svn-id: https://svn.wxwidgets.org/svn/wx/wxWidgets/trunk@18961 c3d73ce0-8a6f-49c7-b76d-6d57e0e08775
---
 docs/latex/wx/pagedlg.tex | 16 ++++++++--------
 docs/latex/wx/print.tex   |  4 ++--
 2 files changed, 10 insertions(+), 10 deletions(-)

diff --git a/docs/latex/wx/pagedlg.tex b/docs/latex/wx/pagedlg.tex
index 26c79a4df1..b81277ac80 100644
--- a/docs/latex/wx/pagedlg.tex
+++ b/docs/latex/wx/pagedlg.tex
@@ -50,13 +50,13 @@ Destructor.
 
 Returns the \helpref{page setup data}{wxpagesetupdialogdata} associated with the dialog.
 
-\membersection{wxPageSetupDialog::Ok}\label{wxpagesetupdialogok}
-
-\constfunc{bool}{Ok}{\void}
-
-Returns true if the print data associated with the dialog data is valid.
-This can return false on Windows if the current printer is not set, for example.
-On all other platforms, it returns true.
+%\membersection{wxPageSetupDialog::Ok}\label{wxpagesetupdialogok}
+%
+%\constfunc{bool}{Ok}{\void}
+%
+%Returns true if the print data associated with the dialog data is valid.
+%This can return false on Windows if the current printer is not set, for example.
+%On all other platforms, it returns true.
 
 \membersection{wxPageSetupDialog::ShowModal}\label{wxpagesetupdialogshowmodal}
 
@@ -250,7 +250,7 @@ selected printer properties. Windows only. Units are in millimetres
 
 \membersection{wxPageSetupDialogData::SetMarginTopLeft}\label{wxpagesetupdialogdatasetmargintopleft}
 
-\func{void}{GetMarginTopLeft}{\param{const wxPoint\& }{pt}}
+\func{void}{SetMarginTopLeft}{\param{const wxPoint\& }{pt}}
 
 Sets the left (x) and top (y) margins in millimetres.
 
diff --git a/docs/latex/wx/print.tex b/docs/latex/wx/print.tex
index 6d88f898ae..c35a1f935f 100644
--- a/docs/latex/wx/print.tex
+++ b/docs/latex/wx/print.tex
@@ -119,7 +119,7 @@ printer should be used.
 
 \membersection{wxPrintData::GetQuality}\label{wxprintdatagetquality}
 
-\constfunc{wxPaperQuality}{GetQuality}{\void}
+\constfunc{wxPrintQuality}{GetQuality}{\void}
 
 Returns the current print quality. This can be a positive integer, denoting the number of dots per inch, or
 one of the following identifiers:
@@ -264,7 +264,7 @@ printer should be used.
 
 \membersection{wxPrintData::SetQuality}\label{wxprintdatasetquality}
 
-\func{void}{SetQuality}{\param{wxPaperQuality}{ quality}}
+\func{void}{SetQuality}{\param{wxPrintQuality}{ quality}}
 
 Sets the desired print quality. This can be a positive integer, denoting the number of dots per inch, or
 one of the following identifiers:
-- 
2.50.0

