From 61cec318da9631b35a2e7c8d58c3b011006724d1 Mon Sep 17 00:00:00 2001
From: Robert Roebling <robert@roebling.de>
Date: Fri, 24 Aug 2007 10:54:36 +0000
Subject: [PATCH] typo

git-svn-id: https://svn.wxwidgets.org/svn/wx/wxWidgets/trunk@48362 c3d73ce0-8a6f-49c7-b76d-6d57e0e08775
---
 docs/latex/wx/dataviewmodel.tex | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

diff --git a/docs/latex/wx/dataviewmodel.tex b/docs/latex/wx/dataviewmodel.tex
index 0fc1425b62..662f99c131 100644
--- a/docs/latex/wx/dataviewmodel.tex
+++ b/docs/latex/wx/dataviewmodel.tex
@@ -15,7 +15,7 @@ define the data model which acts as an interface between
 your actual data and the wxDataViewCtrl. Since you will
 usually also allow the wxDataViewCtrl to change your data
 through its graphical interface, you will also have to override
-\helpref{SetValue}{wxdataviewlistmodelsetvalue} which the
+\helpref{SetValue}{wxdataviewmodelsetvalue} which the
 wxDataViewCtrl will call when a change to some data has been
 commited.
 
@@ -92,7 +92,7 @@ Destructor. This should not be called directly. Use DecRef() instead.
 
 \func{void}{AddNotifier}{\param{wxDataViewModelNotifier* }{notifier}}
 
-Adds a \helpref{wxDataViewModelNotifier}{wxdataviewlistmodelnotifier}
+Adds a \helpref{wxDataViewModelNotifier}{wxdataviewmodelnotifier}
 to the model.
 
 \membersection{wxDataViewModel::Cleared}\label{wxdataviewmodelcleared}
-- 
2.50.0

