From 5cafd4bef65032cbb70070d8c2026dad5518c1ea Mon Sep 17 00:00:00 2001
From: Robert Roebling <robert@roebling.de>
Date: Sat, 9 Sep 2006 14:02:37 +0000
Subject: [PATCH]   Typo.

git-svn-id: https://svn.wxwidgets.org/svn/wx/wxWidgets/trunk@41092 c3d73ce0-8a6f-49c7-b76d-6d57e0e08775
---
 docs/latex/wx/countstr.tex | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

diff --git a/docs/latex/wx/countstr.tex b/docs/latex/wx/countstr.tex
index 056fd67fd6..d55f284ea5 100644
--- a/docs/latex/wx/countstr.tex
+++ b/docs/latex/wx/countstr.tex
@@ -3,7 +3,7 @@
 % -----------------------------------------------------------------------------
 \section{\class{wxCountingOutputStream}}\label{wxcountingoutputstream}
 
-wxCountingOutputStream is a specialized output stream which does not write any data anyway,
+wxCountingOutputStream is a specialized output stream which does not write any data anywhere,
 instead it counts how many bytes would get written if this were a normal stream. This
 can sometimes be useful or required if some data gets serialized to a stream or compressed
 by using stream compression and thus the final size of the stream cannot be known other
-- 
2.50.0

