From 47210d02389e5873cbbbb6da906c24f94f430b33 Mon Sep 17 00:00:00 2001
From: Julian Smart <julian@anthemion.co.uk>
Date: Thu, 22 Feb 2001 12:56:29 +0000
Subject: [PATCH] Corrected Clone return type

git-svn-id: https://svn.wxwidgets.org/svn/wx/wxWidgets/trunk@9412 c3d73ce0-8a6f-49c7-b76d-6d57e0e08775
---
 docs/latex/wx/validatr.tex | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

diff --git a/docs/latex/wx/validatr.tex b/docs/latex/wx/validatr.tex
index fceeb76ed3..765c4d2084 100644
--- a/docs/latex/wx/validatr.tex
+++ b/docs/latex/wx/validatr.tex
@@ -53,7 +53,7 @@ Destructor.
 
 \membersection{wxValidator::Clone}\label{wxvalidatorclone}
 
-\constfunc{virtual wxValidator*}{Clone}{\void}
+\constfunc{virtual wxObject*}{Clone}{\void}
 
 All validator classes must implement the {\bf Clone} function, which returns
 an identical copy of itself. This is because validators are passed to control
-- 
2.50.0

