From 3dce0e4dc3aa68951dd86d5eaaf7ccd2cf6c3109 Mon Sep 17 00:00:00 2001
From: Vadim Zeitlin <vadim@wxwidgets.org>
Date: Mon, 12 Nov 2007 12:09:02 +0000
Subject: [PATCH] clarify wxHandleFatalExceptions() availability (bug 1830196)

git-svn-id: https://svn.wxwidgets.org/svn/wx/wxWidgets/trunk@49857 c3d73ce0-8a6f-49c7-b76d-6d57e0e08775
---
 docs/latex/wx/function.tex | 5 +++++
 1 file changed, 5 insertions(+)

diff --git a/docs/latex/wx/function.tex b/docs/latex/wx/function.tex
index b3230a5d8e..f2b0c5ea81 100644
--- a/docs/latex/wx/function.tex
+++ b/docs/latex/wx/function.tex
@@ -493,6 +493,11 @@ normal way which usually just means that the application will be terminated.
 Calling wxHandleFatalExceptions() with {\it doIt} equal to false will restore
 this default behaviour.
 
+Notice that this function is only available if 
+\texttt{wxUSE\_ON\_FATAL\_EXCEPTION} is $1$ and under Windows platform this
+requires a compiler with support for SEH (structured exception handling) which
+currently means only Microsoft Visual C++ or a recent Borland C++ version.
+
 
 \membersection{::wxInitAllImageHandlers}\label{wxinitallimagehandlers}
 
-- 
2.45.2

