From 2cb94e7ad66471a655561084056bfc77ccf6d0ac Mon Sep 17 00:00:00 2001
From: Kevin Hock <hockkn@yahoo.com>
Date: Fri, 28 Oct 2005 16:01:24 +0000
Subject: [PATCH] Fixed description with number of ways to use timer class,
 updated note about main thread to remove obscure "NB" which may not be well
 understood and removed confusing word "currently"

git-svn-id: https://svn.wxwidgets.org/svn/wx/wxWidgets/trunk@36033 c3d73ce0-8a6f-49c7-b76d-6d57e0e08775
---
 docs/latex/wx/timer.tex | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

diff --git a/docs/latex/wx/timer.tex b/docs/latex/wx/timer.tex
index d5554cd07c..fc32e41259 100644
--- a/docs/latex/wx/timer.tex
+++ b/docs/latex/wx/timer.tex
@@ -4,7 +4,7 @@ The wxTimer class allows you to execute code at specified intervals. Its
 precision is platform-dependent, but in general will not be better than 1ms nor
 worse than 1s.
 
-There are two different ways to use this class:
+There are three different ways to use this class:
 
 \begin{enumerate}
 \item You may derive a new class from wxTimer and override the 
@@ -24,7 +24,7 @@ In any case, you must start the timer with \helpref{Start}{wxtimerstart}
 after constructing it before it actually starts sending notifications. It can
 be stopped later with \helpref{Stop}{wxtimerstop}.
 
-{\bf NB:} note that timer can only be used from the main thread currently.
+{\bf Note:} A timer can only be used from the main thread.
 
 \wxheading{Derived from}
 
-- 
2.50.0

