From 225fe2f2b94ef611c2c9a46014cae6c247fce327 Mon Sep 17 00:00:00 2001
From: Kevin Hock <hockkn@yahoo.com>
Date: Wed, 30 Mar 2005 03:56:18 +0000
Subject: [PATCH] Added note that the GLOBAL config flag refers to HKLM for
 wxRegConfig and only provides read-only access

git-svn-id: https://svn.wxwidgets.org/svn/wx/wxWidgets/trunk@33165 c3d73ce0-8a6f-49c7-b76d-6d57e0e08775
---
 docs/latex/wx/config.tex | 1 +
 1 file changed, 1 insertion(+)

diff --git a/docs/latex/wx/config.tex b/docs/latex/wx/config.tex
index 6b0a17449d..d8b57af2b4 100644
--- a/docs/latex/wx/config.tex
+++ b/docs/latex/wx/config.tex
@@ -386,6 +386,7 @@ add wxCONFIG\_USE\_NO\_ESCAPE\_CHARACTERS which will turn off character
 escaping for the values of entries stored in the config file: for example 
 a {\it foo} key with some backslash characters will be stored as {\tt foo=C:$\backslash$mydir} instead
 of the usual storage of {\tt foo=C:$\backslash\backslash$mydir}.
+For wxRegConfig, this flag refers to HKLM, and provides read-only access.
 
 The wxCONFIG\_USE\_NO\_ESCAPE\_CHARACTERS style can be helpful if your config 
 file must be read or written to by a non-wxWidgets program (which might not 
-- 
2.47.2

