From 1be9182df86e9a902fe9ab6edef960fdc449fed6 Mon Sep 17 00:00:00 2001
From: Robert Roebling <robert@roebling.de>
Date: Wed, 25 Apr 2007 08:20:03 +0000
Subject: [PATCH]   Typo.

git-svn-id: https://svn.wxwidgets.org/svn/wx/wxWidgets/trunk@45639 c3d73ce0-8a6f-49c7-b76d-6d57e0e08775
---
 docs/latex/wx/dataviewmodel.tex | 16 ++++++++--------
 1 file changed, 8 insertions(+), 8 deletions(-)

diff --git a/docs/latex/wx/dataviewmodel.tex b/docs/latex/wx/dataviewmodel.tex
index f658eb5574..095ce8918e 100644
--- a/docs/latex/wx/dataviewmodel.tex
+++ b/docs/latex/wx/dataviewmodel.tex
@@ -133,14 +133,6 @@ display a certain column of this model.
 
 Call this if all data in your model has been cleared.
 
-\membersection{wxDataViewListModel::GetColType}\label{wxdataviewlistmodelgetcoltype}
-
-\func{virtual wxString}{GetColType}{\param{unsigned int }{col}}
-
-Override this to indicate what type of data is stored in the
-column specified by {\it col}. This should return a string
-indicating the type of data as reported by \helpref{wxVariant}{wxvariant}.
-
 \membersection{wxDataViewListModel::GetColumnCount}\label{wxdataviewlistmodelgetcolumncount}
 
 \func{virtual unsigned int}{GetColumnCount}{\void}
@@ -148,6 +140,14 @@ indicating the type of data as reported by \helpref{wxVariant}{wxvariant}.
 Override this to indicate, how many columns the list
 model has.
 
+\membersection{wxDataViewListModel::GetColumnType}\label{wxdataviewlistmodelgetcolumntype}
+
+\func{virtual wxString}{GetColType}{\param{unsigned int }{col}}
+
+Override this to indicate what type of data is stored in the
+column specified by {\it col}. This should return a string
+indicating the type of data as reported by \helpref{wxVariant}{wxvariant}.
+
 \membersection{wxDataViewListModel::GetRowCount}\label{wxdataviewlistmodelgetrowcount}
 
 \func{virtual unsigned int}{GetRowCount}{\void}
-- 
2.50.0

