X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/feb6cde446a73ac2fe9ea0528d6c6eb16cc040fd..749bb9f1291c3c967a25cbbd9aed98a89f7e1511:/docs/latex/wx/process.tex

diff --git a/docs/latex/wx/process.tex b/docs/latex/wx/process.tex
index 0917a04680..dc5f0d92f4 100644
--- a/docs/latex/wx/process.tex
+++ b/docs/latex/wx/process.tex
@@ -48,7 +48,7 @@ for explicit destruction.}
 \func{}{wxProcess}{\param{int }{flags}}
 
 Constructs a process object. {\it id} is only used in the case you want to
-use wxWindows events. It identifies this object, or another window that will
+use wxWidgets events. It identifies this object, or another window that will
 receive the event.
 
 If the {\it parent} parameter is different from NULL, it will receive
@@ -121,6 +121,38 @@ It returns an output stream correspoding to the input stream of the subprocess.
 If it is NULL, you have not turned on the redirection.
 See \helpref{wxProcess::Redirect}{wxprocessredirect}.
 
+\membersection{wxProcess::IsErrorAvailable}\label{wxprocessiserroravailable}
+
+\constfunc{bool}{IsErrorAvailable}{\void}
+
+Returns {\tt true} if there is data to be read on the child process standard
+error stream.
+
+\wxheading{See also}
+
+\helpref{IsInputAvailable}{wxprocessisinputavailable}
+
+\membersection{wxProcess::IsInputAvailable}\label{wxprocessisinputavailable}
+
+\constfunc{bool}{IsInputAvailable}{\void}
+
+Returns {\tt true} if there is data to be read on the child process standard
+output stream. This allows to write simple (and extremely inefficient)
+polling-based code waiting for a better mechanism in future wxWidgets versions.
+
+See the \helpref{exec sample}{sampleexec} for an example of using this
+function.
+
+\wxheading{See also}
+
+\helpref{IsInputOpened}{wxprocessisinputopened}
+
+\membersection{wxProcess::IsInputOpened}\label{wxprocessisinputopened}
+
+\constfunc{bool}{IsInputOpened}{\void}
+
+Returns {\tt true} if the child process standard output stream is opened.
+
 \membersection{wxProcess::Kill}\label{wxprocesskill}
 
 \func{static wxKillError}{Kill}{\param{int}{ pid}, \param{wxSignal}{ signal = wxSIGNONE}}
@@ -176,7 +208,7 @@ enum wxKillError
 
 \func{static bool}{Exists}{\param{int}{ pid}}
 
-Returns {\tt TRUE} if the given process exists in the system.
+Returns {\tt true} if the given process exists in the system.
 
 \wxheading{See also}
 
@@ -188,7 +220,7 @@ Returns {\tt TRUE} if the given process exists in the system.
 \constfunc{void}{OnTerminate}{\param{int}{ pid}, \param{int}{ status}}
 
 It is called when the process with the pid {\it pid} finishes.
-It raises a wxWindows event when it isn't overridden.
+It raises a wxWidgets event when it isn't overridden.
 
 \docparam{pid}{The pid of the process which has just terminated.}
 
@@ -213,7 +245,7 @@ exits to avoid memory leaks.
 
 \docparam{cmd}{The command to execute, including optional arguments.}
 \docparam{flags}{The flags to pass to \helpref{wxExecute}{wxexecute}.
-  NOTE: wxEXEC_SYNC should not be used.}
+  NOTE: wxEXEC\_SYNC should not be used.}
 
 \wxheading{Return value}
 
