X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/feb6cde446a73ac2fe9ea0528d6c6eb16cc040fd..4f7202dd939538bc4bb0655ad6f746848fd2aabf:/docs/latex/wx/process.tex

diff --git a/docs/latex/wx/process.tex b/docs/latex/wx/process.tex
index 0917a04680..95c907c979 100644
--- a/docs/latex/wx/process.tex
+++ b/docs/latex/wx/process.tex
@@ -213,7 +213,7 @@ exits to avoid memory leaks.
 
 \docparam{cmd}{The command to execute, including optional arguments.}
 \docparam{flags}{The flags to pass to \helpref{wxExecute}{wxexecute}.
-  NOTE: wxEXEC_SYNC should not be used.}
+  NOTE: wxEXEC\_SYNC should not be used.}
 
 \wxheading{Return value}
 
