X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/fea35690f171f9677bd9f949c0af3dc16d1a9576..1baa0a9db5e1721dca079ce4f7b1f8e9f2d12e5a:/docs/latex/wx/bufferdc.tex

diff --git a/docs/latex/wx/bufferdc.tex b/docs/latex/wx/bufferdc.tex
index 19d4970eea..7c49e82658 100644
--- a/docs/latex/wx/bufferdc.tex
+++ b/docs/latex/wx/bufferdc.tex
@@ -46,6 +46,10 @@ buffering on the systems which already do it automatically.
 
 <wx/dcbuffer.h>
 
+\wxheading{Library}
+
+\helpref{wxCore}{librarieslist}
+
 \wxheading{See also}
 
 \helpref{wxDC}{wxdc},\rtfsp
@@ -132,6 +136,10 @@ already does this internally for the real underlying wxPaintDC.
 
 <wx/dcbuffer.h>
 
+\wxheading{Library}
+
+\helpref{wxCore}{librarieslist}
+
 \wxheading{See also}
 
 \helpref{wxDC}{wxdc},\rtfsp
