X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/fe604ccddcf5696a751892ad70dbc822be239c95..96db102a93ed103a1c757c4445dd71789c2d0054:/docs/latex/wx/tfont.tex

diff --git a/docs/latex/wx/tfont.tex b/docs/latex/wx/tfont.tex
index 47fbfdef2b..f79794290a 100644
--- a/docs/latex/wx/tfont.tex
+++ b/docs/latex/wx/tfont.tex
@@ -27,7 +27,7 @@ or if allowing the user to specify a face name, store the family id with any fil
 might be transported to a different Windows machine or other platform.
 
 \normalbox{{\bf Note:} There is currently a difference between the appearance of fonts on the
-two platforms, if the mapping mode is anything other than MM\_TEXT.
+two platforms, if the mapping mode is anything other than wxMM\_TEXT.
 Under X, font size is always specified in points. Under MS Windows, the
 unit for text is points but the text is scaled according to the
 current mapping mode. However, user scaling on a device context will
