X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/fe161a2685012cf90bb5bfe95f2260aee71d8ad7..f050223c833f26debd148142d800dd5bce1c56bd:/docs/latex/wx/control.tex?ds=sidebyside

diff --git a/docs/latex/wx/control.tex b/docs/latex/wx/control.tex
index 52ecc060f2..75c4e5f975 100644
--- a/docs/latex/wx/control.tex
+++ b/docs/latex/wx/control.tex
@@ -29,14 +29,6 @@ displays one or more item of data.
 Simulates the effect of the user issuing a command to the item. See \helpref{wxCommandEvent}{wxcommandevent}.
 
 
-\membersection{wxControl::GetAdjustMinSizeFlag}\label{wxcontrolgetadjustminsizeflag}
-
-\func{bool}{GetAdjustMinSizeFlag}{}
-
-Returns whether the minsize should be adjusted for this control when
-SetLabel or SetFont are called.
-
-
 \membersection{wxControl::GetLabel}\label{wxcontrolgetlabel}
 
 \func{wxString\&}{GetLabel}{\void}
@@ -44,14 +36,6 @@ SetLabel or SetFont are called.
 Returns the control's text.
 
 
-\membersection{wxControl::SetAdjustMinSizeFlag}\label{wxcontrolsetadjustminsizeflag}
-
-\func{void}{SetAdjustMinSizeFlag}{\param{bool }{adjust}}
-
-By default controls will readjust their size and minsize when
-SetLabel or SetFont are called.  This flag will allow you to
-control this behavior.
-
 \membersection{wxControl::SetLabel}\label{wxcontrolsetlabel}
 
 \func{void}{SetLabel}{\param{const wxString\& }{label}}
