X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/fd128b0c3ab84380d782e45bfa98f181a848df27..7946d7deaac081a745dc616a5eb13ae864865fa2:/docs/latex/wx/noteevt.tex

diff --git a/docs/latex/wx/noteevt.tex b/docs/latex/wx/noteevt.tex
index 4fcc6816d6..92d84b60a7 100644
--- a/docs/latex/wx/noteevt.tex
+++ b/docs/latex/wx/noteevt.tex
@@ -4,7 +4,7 @@ This class represents the events generated by a notebook control: currently,
 there are two of them. The PAGE\_CHANGING event is sent before the current
 page is changed. It allows to the program to examine the current page (which
 can be retrieved with 
-\helpref{GetOldSelection()}wxnotebookeventgetoldselection}) and to veto the page
+\helpref{GetOldSelection()}{wxnotebookeventgetoldselection}) and to veto the page
 change by calling \helpref{Veto()}{wxnotifyeventveto} if, for example, the
 current values in the controls of the old page are invalid.
 
@@ -16,6 +16,10 @@ before allowing the user to change it, it should process the PAGE\_CHANGING
 event, otherwise PAGE\_CHANGED is probably enough. In any case, it is probably
 unnecessary to process both events at once.
 
+{\bf NB:} under Windows, GetSelection() will return the same value as
+GetOldSelection() when called from PAGE\_CHANGING handler and not the page
+which is going to be selected if the handler doesn't call Veto().
+
 \wxheading{Derived from}
 
 \helpref{wxNotifyEvent}{wxnotifyevent}\\
