X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/fcea31d51bf897c782618063279c6876a7807e83..6626de903e54f907fed5737b61344e31f86262eb:/docs/latex/wx/ffile.tex

diff --git a/docs/latex/wx/ffile.tex b/docs/latex/wx/ffile.tex
index fafe340746..e4b09dbb03 100644
--- a/docs/latex/wx/ffile.tex
+++ b/docs/latex/wx/ffile.tex
@@ -41,7 +41,7 @@ None.
 
 Default constructor.
 
-\func{}{wxFFile}{\param{const char*}{ filename}, \param{const char*}{ mode = "r"}}
+\func{}{wxFFile}{\param{const wxString\&}{ filename}, \param{const wxString\&}{ mode = "r"}}
 
 Opens a file with the given mode. As there is no way to return whether the
 operation was successful or not from the constructor you should test the
@@ -180,7 +180,7 @@ Returns the length of the file.
 
 \membersection{wxFFile::Open}\label{wxffileopen}
 
-\func{bool}{Open}{\param{const char*}{ filename}, \param{const char*}{ mode = "r"}}
+\func{bool}{Open}{\param{const wxString\&}{ filename}, \param{const wxString\&}{ mode = "r"}}
 
 Opens the file, returning \true if successful.
 
