X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/fc7995487f3032d8415f87619efac7c391c72730..f811bc9ac07404a8e90570b243918d11289ef1e2:/docs/latex/wx/print.tex

diff --git a/docs/latex/wx/print.tex b/docs/latex/wx/print.tex
index 8fa5bdd5a5..063ee8dfe6 100644
--- a/docs/latex/wx/print.tex
+++ b/docs/latex/wx/print.tex
@@ -134,6 +134,14 @@ wxPRINT_QUALITY_DRAFT
 On input you should pass one of these identifiers, but on return you may get back a positive integer
 indicating the current resolution setting.
 
+\membersection{wxPrintData::Ok}\label{wxprintdataok}
+
+\constfunc{bool}{Ok}{\void}
+
+Returns TRUE if the print data is valid for using in print dialogs.
+This can return FALSE on Windows if the current printer is not set, for example.
+On all other platforms, it returns TRUE.
+
 \membersection{wxPrintData::SetCollate}\label{wxprintdatasetcollate}
 
 \func{void}{SetCollate}{\param{bool }{flag}}
@@ -338,6 +346,14 @@ When this function has been called, the ownership of the device context
 is transferred to the application, so it must then be deleted
 explicitly.
 
+\membersection{wxPrintDialog::Ok}\label{wxprintdialogok}
+
+\constfunc{bool}{Ok}{\void}
+
+Returns TRUE if the print data associated with the dialog is valid.
+This can return FALSE on Windows if the current printer is not set, for example.
+On all other platforms, it returns TRUE.
+
 \membersection{wxPrintDialog::ShowModal}\label{wxprintdialogshowmodal}
 
 \func{int}{ShowModal}{\void}
@@ -470,6 +486,14 @@ a concept specific to the application).
 
 Returns the {\it to} page number, as entered by the user.
 
+\membersection{wxPrintDialogData::Ok}\label{wxprintdialogdataok}
+
+\constfunc{bool}{Ok}{\void}
+
+Returns TRUE if the print data is valid for using in print dialogs.
+This can return FALSE on Windows if the current printer is not set, for example.
+On all other platforms, it returns TRUE.
+
 \membersection{wxPrintDialogData::SetCollate}\label{wxprintdialogdatasetcollate}
 
 \func{void}{SetCollate}{\param{bool }{flag}}
@@ -698,7 +722,7 @@ Constructor. With empty strings for the first three arguments, the default print
 displayed. {\it device} indicates the type of printer and {\it output}
 is an optional file for printing to. The {\it driver} parameter is
 currently unused.  Use the {\it Ok} member to test whether the
-constructor was successful in creating a useable device context.
+constructor was successful in creating a usable device context.
 
 This constructor is deprecated and retained only for backward compatibility.
 
@@ -729,7 +753,7 @@ wxPrintPreview object to initiate printing or previewing.
 
 \func{}{wxPrintout}{\param{const wxString\& }{title = "Printout"}}
 
-Constructor. Pass an optional title argument - the curent filename would be a good idea. This will appear in the printing list
+Constructor. Pass an optional title argument - the current filename would be a good idea. This will appear in the printing list
 (at least in MSW)
 
 \membersection{wxPrintout::\destruct{wxPrintout}}
