X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/fc4fe30871fad3e3957c299838f3eba5ddb9e3b5..6a27c749b302e17446080bb232ef8010b60f3d00:/docs/latex/wx/conditn.tex

diff --git a/docs/latex/wx/conditn.tex b/docs/latex/wx/conditn.tex
index 52dfc70846..2549e477f6 100644
--- a/docs/latex/wx/conditn.tex
+++ b/docs/latex/wx/conditn.tex
@@ -111,7 +111,7 @@ None.
 
 \latexignore{\rtfignore{\wxheading{Members}}}
 
-\membersection{wxCondition::wxCondition}\label{wxconditionconstr}
+\membersection{wxCondition::wxCondition}\label{wxconditionctor}
 
 \func{}{wxCondition}{\param{wxMutex\& }{mutex}}
 
@@ -119,9 +119,9 @@ Default and only constructor. The {\it mutex} must be locked by the caller
 before calling \helpref{Wait}{wxconditionwait} function.
 
 Use \helpref{IsOk}{wxconditionisok} to check if the object was successfully
-intiialized.
+initialized.
 
-\membersection{wxCondition::\destruct{wxCondition}}
+\membersection{wxCondition::\destruct{wxCondition}}\label{wxconditiondtor}
 
 \func{}{\destruct{wxCondition}}{\void}
 
@@ -205,6 +205,6 @@ timeout expires.
 \wxheading{Return value}
 
 Returns {\tt wxCOND\_NO\_ERROR} if the condition was signalled, 
-{\tt wxCOND\_TIMEOUT} if the timeout elapsed ebfore this happened or another
+{\tt wxCOND\_TIMEOUT} if the timeout elapsed before this happened or another
 error code from wxCondError enum.
 
