X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/fc4fb52856f7a020d4595e6e38f0e23fe9f6e1c8..f973828cd9b31d3b80386fab5e6f7c4a106d97fc:/docs/latex/wx/stream.tex?ds=sidebyside

diff --git a/docs/latex/wx/stream.tex b/docs/latex/wx/stream.tex
index bdf3d7416b..d82bbf9b91 100644
--- a/docs/latex/wx/stream.tex
+++ b/docs/latex/wx/stream.tex
@@ -91,7 +91,7 @@ accordingly until all requested data is read.
 
 It returns the size of the data read. If the returned size is different of the specified 
 {\it size}, an error has occurred and should be tested using 
-\helpref{LastError}{wxstreambaselasterror}.
+\helpref{GetLastError}{wxstreambasegetlasterror}.
 
 \func{size\_t}{Read}{\param{wxStreamBuffer *}{buffer}}
 
