X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/fc2171bd4c660b8554dae2a1cbf34ff09f3032a6..f98488c8ca626661a4f414bdf38f45254fecb03e:/docs/latex/wx/splitevt.tex

diff --git a/docs/latex/wx/splitevt.tex b/docs/latex/wx/splitevt.tex
index 520df0d44f..9f430e802d 100644
--- a/docs/latex/wx/splitevt.tex
+++ b/docs/latex/wx/splitevt.tex
@@ -32,8 +32,8 @@ modify the position of the tracking bar to properly reflect the position that
 would be set if the drag were to be completed at this point. Processes a
 wxEVT\_COMMAND\_SPLITTER\_SASH\_POS\_CHANGING event.}
 \twocolitem{{\bf EVT\_SPLITTER\_SASH\_POS\_CHANGED(id, func)}}{The sash
-position was changed. May be used to modify the sash position before
-it is set, or to prevent the change from taking place.
+position was changed. This event is generated after the user releases the mouse
+after dragging the splitter.
 Processes a wxEVT\_COMMAND\_SPLITTER\_SASH\_POS\_CHANGED event.}
 \twocolitem{{\bf EVT\_SPLITTER\_UNSPLIT(id, func)}}{The splitter has been just
 unsplit. Processes a wxEVT\_COMMAND\_SPLITTER\_UNSPLIT event. This event can't
