X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/fc2171bd4c660b8554dae2a1cbf34ff09f3032a6..f7204798e2b7db9e5ebd94c327ed0fef72b18862:/docs/latex/wx/bufferdc.tex

diff --git a/docs/latex/wx/bufferdc.tex b/docs/latex/wx/bufferdc.tex
index 817fce0a1e..31058d7500 100644
--- a/docs/latex/wx/bufferdc.tex
+++ b/docs/latex/wx/bufferdc.tex
@@ -59,7 +59,7 @@ flushed to this DC when this object is destroyed.  You may pass NULL
 in order to just initialize the buffer, and not flush it.}
 
 \docparam{area}{The size of the bitmap to be used for buffering (this bitmap is
-created internally when it is not given explicitely).}
+created internally when it is not given explicitly).}
 
 \docparam{buffer}{Explicitly provided bitmap to be used for buffering: this is
 the most efficient solution as the bitmap doesn't have to be recreated each
