X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/fc2171bd4c660b8554dae2a1cbf34ff09f3032a6..ea9aa80e7c667e2951ac0967da903d2b9ec5e2b6:/docs/latex/wx/tdelwin.tex?ds=sidebyside

diff --git a/docs/latex/wx/tdelwin.tex b/docs/latex/wx/tdelwin.tex
index e6b68cc25b..ff8b02df27 100644
--- a/docs/latex/wx/tdelwin.tex
+++ b/docs/latex/wx/tdelwin.tex
@@ -53,9 +53,6 @@ In other words, by default, the dialog {\it is not destroyed} (it might have bee
 on the stack, so the assumption of dynamic creation cannot be made).
 
 The default close event handler for wxFrame destroys the frame using Destroy().
-%
-%Under Windows, wxDialog defines a handler for \helpref{wxWindow::OnCharHook}{wxwindowoncharhook} that
-%generates a Cancel event if the Escape key has been pressed.
 
 \wxheading{What should I do when the user calls up Exit from a menu?}
 
