X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/fc2171bd4c660b8554dae2a1cbf34ff09f3032a6..df10208f26d2659e5995fd00debeb4eaa11174cc:/docs/latex/wx/vlbox.tex?ds=sidebyside

diff --git a/docs/latex/wx/vlbox.tex b/docs/latex/wx/vlbox.tex
index 1050b7f80e..e57ca9fd69 100644
--- a/docs/latex/wx/vlbox.tex
+++ b/docs/latex/wx/vlbox.tex
@@ -129,7 +129,7 @@ Get the number of items in the control.
 \constfunc{wxPoint}{GetMargins}{\void}
 
 Returns the margins used by the control. The {\tt x} field of the returned
-point is the horizontal margine and the {\tt y} field is the vertical one.
+point is the horizontal margin and the {\tt y} field is the vertical one.
 
 \wxheading{See also}
 
