<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/fc2171bd4c660b8554dae2a1cbf34ff09f3032a6..9bf6a1b80cb856903e15387ebecc926142e73010:/docs/latex/wx/debugcxt.tex

diff --git a/docs/latex/wx/debugcxt.tex b/docs/latex/wx/debugcxt.tex
index 8093314875..ae38e3e815 100644
--- a/docs/latex/wx/debugcxt.tex
+++ b/docs/latex/wx/debugcxt.tex
@@ -15,6 +15,10 @@ No parent class.
 
 &lt;wx/memory.h&gt;
 
+\wxheading{Library}
+
+\helpref{wxBase}{librarieslist}
+
 \wxheading{See also}
 
 \overview{Overview}{wxdebugcontextoverview}
</pre></body></html>