X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/fc2171bd4c660b8554dae2a1cbf34ff09f3032a6..81c882b613b5d99ddb1e5ab69fcd7ebccc287025:/docs/latex/wx/tlog.tex

diff --git a/docs/latex/wx/tlog.tex b/docs/latex/wx/tlog.tex
index e0d6b8a35d..713757d6ca 100644
--- a/docs/latex/wx/tlog.tex
+++ b/docs/latex/wx/tlog.tex
@@ -13,7 +13,7 @@ Classes: \helpref{wxLog}{wxlog},\\
 
 This is a general overview of logging classes provided by wxWidgets. The word
 logging here has a broad sense, including all of the program output, not only
-non interactive messages. The logging facilities included in wxWidgets provide
+non-interactive messages. The logging facilities included in wxWidgets provide
 the base {\it wxLog} class which defines the standard interface for a {\it log
 target} as well as several standard implementations of it and a family of
 functions to use with them.
@@ -35,10 +35,7 @@ message box to inform the user about it.
 \item{\bf wxLogWarning} for warnings - they are also normally shown to the
 user, but don't interrupt the program work.
 \item{\bf wxLogMessage} is for all normal, informational messages. They also
-appear in a message box by default (but it can be changed, see below). Notice
-that the standard behaviour is to not show informational messages if there are
-any errors later - the logic being that the later error messages make the
-informational messages preceding them meaningless.
+appear in a message box by default (but it can be changed, see below).
 \item{\bf wxLogVerbose} is for verbose output. Normally, it is suppressed, but
 might be activated if the user wishes to know more details about the program
 progress (another, but possibly confusing name for the same function is {\bf
