X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/fc2171bd4c660b8554dae2a1cbf34ff09f3032a6..763b330106e9d3c9c198fc1b1cac4e1ca06c222f:/docs/latex/wx/minifram.tex?ds=sidebyside

diff --git a/docs/latex/wx/minifram.tex b/docs/latex/wx/minifram.tex
index 4c16e08fee..e51efd81ca 100644
--- a/docs/latex/wx/minifram.tex
+++ b/docs/latex/wx/minifram.tex
@@ -53,7 +53,7 @@ On other platforms, it behaves like a normal frame.
 
 \latexignore{\rtfignore{\wxheading{Members}}}
 
-\membersection{wxMiniFrame::wxMiniFrame}\label{wxminiframeconstr}
+\membersection{wxMiniFrame::wxMiniFrame}\label{wxminiframector}
 
 \func{}{wxMiniFrame}{\void}
 
@@ -95,7 +95,7 @@ The frame behaves like a normal frame on non-Windows platforms.
 
 \helpref{wxMiniFrame::Create}{wxminiframecreate}
 
-\membersection{wxMiniFrame::\destruct{wxMiniFrame}}
+\membersection{wxMiniFrame::\destruct{wxMiniFrame}}\label{wxminiframedtor}
 
 \func{void}{\destruct{wxMiniFrame}}{\void}
 
@@ -108,7 +108,7 @@ Destructor. Destroys all child windows and menu bar if present.
 \param{const wxSize\&}{ size = wxDefaultSize}, \param{long}{ style = wxDEFAULT\_FRAME\_STYLE},\rtfsp
 \param{const wxString\& }{name = ``frame"}}
 
-Used in two-step frame construction. See \helpref{wxMiniFrame::wxMiniFrame}{wxminiframeconstr}\rtfsp
+Used in two-step frame construction. See \helpref{wxMiniFrame::wxMiniFrame}{wxminiframector}\rtfsp
 for further details.
 
 
