X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/fc2171bd4c660b8554dae2a1cbf34ff09f3032a6..749704355bd9ca68cfe629aa59af8fabb7dce0ff:/docs/latex/wx/recguard.tex?ds=inline

diff --git a/docs/latex/wx/recguard.tex b/docs/latex/wx/recguard.tex
index f9e29f19c4..92049cd8af 100644
--- a/docs/latex/wx/recguard.tex
+++ b/docs/latex/wx/recguard.tex
@@ -6,13 +6,13 @@
 %% Created:     14.08.03
 %% RCS-ID:      $Id$
 %% Copyright:   (c) Vadim Zeitlin
-%% License:     wxWidgets license
+%% License:     wxWindows license
 %%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
 
 \section{\class{wxRecursionGuard}}\label{wxrecursionguard}
 
 wxRecursionGuard is a very simple class which can be used to prevent reentrancy
-problems in a function. It is not thread-safe and so should be used only in the
+problems in a function. It is not thread-safe and so should be used only in
 single-threaded programs or in combination with some thread synchronization
 mechanisms.
 
