X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/fc2171bd4c660b8554dae2a1cbf34ff09f3032a6..6e4ae332ac7d85be3592640ffef56a60924cc1c9:/docs/latex/wx/debugcxt.tex

diff --git a/docs/latex/wx/debugcxt.tex b/docs/latex/wx/debugcxt.tex
index 8093314875..4967c04bdd 100644
--- a/docs/latex/wx/debugcxt.tex
+++ b/docs/latex/wx/debugcxt.tex
@@ -15,6 +15,10 @@ No parent class.
 
 <wx/memory.h>
 
+\wxheading{Library}
+
+\helpref{wxBase}{librarieslist}
+
 \wxheading{See also}
 
 \overview{Overview}{wxdebugcontextoverview}
@@ -213,6 +217,15 @@ This is obsolete, replaced by \helpref{wxLog}{wxlog} functionality.
 
 \helpref{wxDebugContext::GetLevel}{wxdebugcontextgetlevel}
 
+\membersection{wxDebugContext::SetShutdownNotifyFunction}\label{wxdebugcontextsetshutdownnotifyhook}
+
+\func{void}{SetShutdownNotifyFunction}{\param{wxShutdownNotifyFunction }{func}}
+
+Installs a function to be called at the end of wxWidgets shutdown. It will be called after
+all files with global instances of wxDebugContextDumpDelayCounter have run their destructors.
+
+The shutdown function must be take no parameters and return nothing.
+
 \membersection{wxDebugContext::SetStandardError}\label{wxdebugcontextsetstandarderror}
 
 \func{bool}{SetStandardError}{\void}
