X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/fc2171bd4c660b8554dae2a1cbf34ff09f3032a6..544229d1069a20ca4c81fac6059aa4d92d8559ef:/docs/latex/wx/log.tex

diff --git a/docs/latex/wx/log.tex b/docs/latex/wx/log.tex
index ec53f6792f..447d73d2f9 100644
--- a/docs/latex/wx/log.tex
+++ b/docs/latex/wx/log.tex
@@ -727,7 +727,7 @@ any extra initializations.
 
 \membersection{wxLogWindow::OnFrameClose}\label{wxlogwindowonframeclose}
 
-\func{virtual void}{OnFrameClose}{\param{wxFrame }{*frame}}
+\func{virtual bool}{OnFrameClose}{\param{wxFrame }{*frame}}
 
 Called if the user closes the window interactively, will not be
 called if it is destroyed for another reason (such as when program
