X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/fc2171bd4c660b8554dae2a1cbf34ff09f3032a6..544229d1069a20ca4c81fac6059aa4d92d8559ef:/docs/latex/wx/glcanvas.tex

diff --git a/docs/latex/wx/glcanvas.tex b/docs/latex/wx/glcanvas.tex
index 714c243721..8c5b4d66e1 100644
--- a/docs/latex/wx/glcanvas.tex
+++ b/docs/latex/wx/glcanvas.tex
@@ -57,6 +57,10 @@ alpha channel, and accum buffer. Other implementations may support them.
 \twocolitem{\windowstyle{WX\_GL\_MIN\_ACCUM\_ALPHA}}{Use blue buffer with most bits (> MIN\_ACCUM\_ALPHA bits)}
 \end{twocollist}
 
+\wxheading{See also}
+
+\helpref{wxGLContext}{wxglcontext}
+
 \latexignore{\rtfignore{\wxheading{Members}}}
 
 \membersection{wxGLCanvas::wxGLCanvas}\label{wxglcanvasconstr}
@@ -77,6 +81,8 @@ Constructor.
 
 \docparam{parent}{Pointer to a parent window.}
 
+\docparam{sharedcontext}{Context to share object resources with.}
+
 \docparam{id}{Window identifier. If -1, will automatically create an identifier.}
 
 \docparam{pos}{Window position. wxDefaultPosition is (-1, -1) which indicates that wxWidgets
@@ -104,12 +110,18 @@ and so on.
 \docparam{palette}{If the window has the palette, it should by pass this value.
 Note: palette and WX\_GL\_RGBA are mutually exclusive.}
 
+\membersection{wxGLCanvas::GetContext}\label{wxglcanvasgetcontext}
+
+\func{wxGLContext*}{GetContext}{\void}
+
+Obtains the context that is associated with this canvas.
+
 \membersection{wxGLCanvas::SetCurrent}\label{wxglcanvassetcurrent}
 
 \func{void}{SetCurrent}{\void}
 
 Sets this canvas as the current recipient of OpenGL calls.
-Each canvas contain an OpenGL device context that has been created during
+Each canvas contains an OpenGL device context that has been created during
 the creation of this window. So this call sets the current device context
 as the target device context for OpenGL operations.
 
