X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/fc2171bd4c660b8554dae2a1cbf34ff09f3032a6..380740af5dd112601916704a6d78d1112ebb31b5:/docs/latex/wx/splitevt.tex

diff --git a/docs/latex/wx/splitevt.tex b/docs/latex/wx/splitevt.tex
index 520df0d44f..368c2df85f 100644
--- a/docs/latex/wx/splitevt.tex
+++ b/docs/latex/wx/splitevt.tex
@@ -18,6 +18,10 @@ in assert failure (in debug mode) and will return meaningless results.
 
 <wx/splitter.h>
 
+\wxheading{Library}
+
+\helpref{wxCore}{librarieslist}
+
 \wxheading{Event table macros}
 
 To process a splitter event, use these event handler macros to direct input to member
@@ -32,8 +36,8 @@ modify the position of the tracking bar to properly reflect the position that
 would be set if the drag were to be completed at this point. Processes a
 wxEVT\_COMMAND\_SPLITTER\_SASH\_POS\_CHANGING event.}
 \twocolitem{{\bf EVT\_SPLITTER\_SASH\_POS\_CHANGED(id, func)}}{The sash
-position was changed. May be used to modify the sash position before
-it is set, or to prevent the change from taking place.
+position was changed. This event is generated after the user releases the mouse
+after dragging the splitter.
 Processes a wxEVT\_COMMAND\_SPLITTER\_SASH\_POS\_CHANGED event.}
 \twocolitem{{\bf EVT\_SPLITTER\_UNSPLIT(id, func)}}{The splitter has been just
 unsplit. Processes a wxEVT\_COMMAND\_SPLITTER\_UNSPLIT event. This event can't
@@ -108,7 +112,7 @@ wxEVT\_COMMAND\_SPLITTER\_UNSPLIT events.
 \func{void}{SetSashPosition}{\param{int}{ pos}}
 
 In the case of wxEVT\_COMMAND\_SPLITTER\_SASH\_POS\_CHANGED events,
-sets the the new sash position. In the case of
+sets the new sash position. In the case of
 wxEVT\_COMMAND\_SPLITTER\_SASH\_POS\_CHANGING events, sets the new
 tracking bar position so visual feedback during dragging will
 represent that change that will actually take place. Set to -1 from
