X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/fc2171bd4c660b8554dae2a1cbf34ff09f3032a6..1ccc19ce9d4adf55bbe64f4d8bbcaf276328c7e8:/docs/latex/wx/tsizer.tex

diff --git a/docs/latex/wx/tsizer.tex b/docs/latex/wx/tsizer.tex
index 766d818922..e7f106004f 100644
--- a/docs/latex/wx/tsizer.tex
+++ b/docs/latex/wx/tsizer.tex
@@ -3,7 +3,6 @@
 Classes: \helpref{wxSizer}{wxsizer}, \helpref{wxGridSizer}{wxgridsizer}, 
 \helpref{wxFlexGridSizer}{wxflexgridsizer}, \helpref{wxBoxSizer}{wxboxsizer}, 
 \helpref{wxStaticBoxSizer}{wxstaticboxsizer}, 
-\helpref{wxNotebookSizer}{wxnotebooksizer},
 \helpref{CreateButtonSizer}{createbuttonsizer}
 
 Sizers, as represented by the wxSizer class and its descendants in
@@ -182,14 +181,6 @@ the same dialog as the one above, but using a flex grid sizer:
 \myimage{sizer11.eps}
 \end{center}
 
-\wxheading{wxNotebookSizer}
-
-\helpref{wxNotebookSizer}{wxnotebooksizer} can be used
-with notebooks. It calculates the size of each
-notebook page and sets the size of the notebook to the size
-of the biggest page plus some extra space required for the
-notebook tabs and decorations.
-
 \subsection{Programming with wxBoxSizer}\label{boxsizerprogramming}
 
 The basic idea behind a \helpref{wxBoxSizer}{wxboxsizer} is that windows will most often be laid out in rather
@@ -289,39 +280,6 @@ height and all fields in one column having the same width, but all
 rows or all columns are not necessarily the same height or width as in
 the \helpref{wxGridSizer}{wxgridsizer}.
 
-\subsection{Programming with wxNotebookSizer}\label{notebooksizerprogramming}
-
-\helpref{wxNotebookSizer}{wxnotebooksizer} is a specialized sizer to make sizers work in connection
-with using notebooks. This sizer is different from any other sizer as 
-you must not add any children to it - instead, it queries the notebook class itself.
-The only thing this sizer does is to determine the size of the biggest
-page of the notebook and report an adjusted minimal size to a more toplevel
-sizer.
-
-In order to query the size of notebook page, this page needs to have its
-own sizer, otherwise the wxNotebookSizer will ignore it. Notebook pages
-get their sizer by assigning one to them using \helpref{wxWindow::SetSizer}{wxwindowsetsizer} 
-and setting the auto-layout option to true using 
-\helpref{wxWindow::SetAutoLayout}{wxwindowsetautolayout}. Here is one
-example showing how to add a notebook page that the notebook sizer is
-aware of:
-
-\begin{verbatim}
-    wxNotebook *notebook = new wxNotebook( &dialog, -1 );
-    wxNotebookSizer *nbs = new wxNotebookSizer( notebook );
-
-    // Add panel as notebook page
-    wxPanel *panel = new wxPanel( notebook, -1 );
-    notebook->AddPage( panel, "My Notebook Page" );
-
-    wxBoxSizer *panelsizer = new wxBoxSizer( wxVERTICAL );
-
-    // Add controls to panel and panelsizer here...
-
-    panel->SetAutoLayout( true );
-    panel->SetSizer( panelsizer );
-\end{verbatim}
-
 \subsection{Programming with wxStaticBoxSizer}\label{staticboxsizerprogramming}
 
 \helpref{wxStaticBoxSizer}{wxstaticboxsizer} is a sizer derived from wxBoxSizer but adds a static
