X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/fc2171bd4c660b8554dae2a1cbf34ff09f3032a6..0bab4df569d6d43dc21e6c8a1fe684c7055e93e5:/docs/latex/wx/vlbox.tex?ds=sidebyside

diff --git a/docs/latex/wx/vlbox.tex b/docs/latex/wx/vlbox.tex
index 1050b7f80e..d89098dd5c 100644
--- a/docs/latex/wx/vlbox.tex
+++ b/docs/latex/wx/vlbox.tex
@@ -6,7 +6,7 @@
 %% Created:     01.06.03
 %% RCS-ID:      $Id$
 %% Copyright:   (c) 2003 Vadim Zeitlin <vadim@wxwindows.org>
-%% License:     wxWidgets license
+%% License:     wxWindows license
 %%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
 
 \section{\class{wxVListBox}}\label{wxvlistbox}
@@ -129,7 +129,7 @@ Get the number of items in the control.
 \constfunc{wxPoint}{GetMargins}{\void}
 
 Returns the margins used by the control. The {\tt x} field of the returned
-point is the horizontal margine and the {\tt y} field is the vertical one.
+point is the horizontal margin and the {\tt y} field is the vertical one.
 
 \wxheading{See also}
 
