X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/fbfb8bcc3fa17e079d4219655b173f8ed2ccc65a..a43ec16b16cf61894294f071011ec984d8a3d673:/docs/latex/wx/htwindow.tex

diff --git a/docs/latex/wx/htwindow.tex b/docs/latex/wx/htwindow.tex
index 01c50a9223..eddfc34f44 100644
--- a/docs/latex/wx/htwindow.tex
+++ b/docs/latex/wx/htwindow.tex
@@ -197,7 +197,7 @@ false if an error occurred, true otherwise
 
 \membersection{wxHtmlWindow::OnCellClicked}\label{wxhtmlwindowoncellclicked}
 
-\func{virtual void}{OnCellClicked}{\param{wxHtmlCell }{*cell}, \param{wxCoord }{x}, \param{wxCoord }{y}, \param{const wxMouseEvent\& }{event}}
+\func{virtual bool}{OnCellClicked}{\param{wxHtmlCell }{*cell}, \param{wxCoord }{x}, \param{wxCoord }{y}, \param{const wxMouseEvent\& }{event}}
 
 This method is called when a mouse button is clicked inside wxHtmlWindow.
 The default behaviour is to call 
@@ -207,12 +207,16 @@ hypertext link.
 \wxheading{Parameters}
 
 \docparam{cell}{The cell inside which the mouse was clicked, always a simple
-(i.e. non container) cell}
+(i.e. non-container) cell}
 
 \docparam{x, y}{The logical coordinates of the click point}
 
 \docparam{event}{The mouse event containing other information about the click}
 
+\wxheading{Return value}
+
+\true if a link was clicked, \false otherwise.
+
 \membersection{wxHtmlWindow::OnCellMouseHover}\label{wxhtmlwindowoncellmousehover}
 
 \func{virtual void}{OnCellMouseHover}{\param{wxHtmlCell }{*cell}, \param{wxCoord }{x}, \param{wxCoord }{y}}
@@ -222,7 +226,7 @@ This method is called when a mouse moves over an HTML cell.
 \wxheading{Parameters}
 
 \docparam{cell}{The cell inside which the mouse is currently, always a simple
-(i.e. non container) cell}
+(i.e. non-container) cell}
 
 \docparam{x, y}{The logical coordinates of the click point}
 
