X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/fbfb8bcc3fa17e079d4219655b173f8ed2ccc65a..6e65f80be5dfcc75bd520fc320d3389e4559bccf:/docs/latex/wx/socksrv.tex?ds=sidebyside

diff --git a/docs/latex/wx/socksrv.tex b/docs/latex/wx/socksrv.tex
index f4e4553fe5..d835149189 100644
--- a/docs/latex/wx/socksrv.tex
+++ b/docs/latex/wx/socksrv.tex
@@ -36,7 +36,7 @@
 
 Constructs a new server and tries to bind to the specified {\it address}.
 Before trying to accept new connections, test whether it succeeded with 
-\helpref{wxSocketBase::Ok}{wxsocketbaseok}.
+\helpref{wxSocketBase:IsOk}{wxsocketbaseisok}.
 
 \wxheading{Parameters}
 
