X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/fabe121c9ca2783ccba4e07d8e903c5a80b703a9..f415cab9ef1433413a1a68a982ee9b17c5a8deda:/docs/latex/wx/tsamples.tex

diff --git a/docs/latex/wx/tsamples.tex b/docs/latex/wx/tsamples.tex
index dd201e9b3c..46c7967120 100644
--- a/docs/latex/wx/tsamples.tex
+++ b/docs/latex/wx/tsamples.tex
@@ -598,3 +598,4 @@ but sometimes it depends on the user choices: wxCheckboxPage shows how to
 dynamically decide which page to display next (see also
 \helpref{wxWizardPage}{wxwizardpage})
 \end{itemize}
+
