X-Git-Url: https://git.saurik.com/wxWidgets.git/blobdiff_plain/fab86f26bf792dc79c67968dad906e4afa00a98c..81c882b613b5d99ddb1e5ab69fcd7ebccc287025:/docs/latex/wx/app.tex

diff --git a/docs/latex/wx/app.tex b/docs/latex/wx/app.tex
index d29ee9d6db..3c851113ac 100644
--- a/docs/latex/wx/app.tex
+++ b/docs/latex/wx/app.tex
@@ -519,10 +519,13 @@ should return $0$ in case of successful termination.
 
 This function is called when an unhandled C++ exception occurs inside 
 \helpref{OnRun()}{wxapponrun} (the exceptions which occur during the program
-startup and shutdown might not be caught at all).
-Note that the exception type is lost by now, so if you want to really handle
-the exception you should override \helpref{OnRun()}{wxapponrun} and put a
-try/catch clause around the call to the base class version there.
+startup and shutdown might not be caught at all). Notice that by now the main
+event loop has been terminated and the program will exit, if you want to
+prevent this from happening (i.e. continue running after catching an exception)
+you need to override \helpref{OnExceptionInMainLoop}{wxapponexceptioninmainloop}.
+
+The default implementation shows information about the exception in debug build
+but does nothing in the release build.
 
 
 \membersection{wxApp::ProcessMessage}\label{wxappprocessmessage}
